-- Table: public.asyncmotor_rated

-- DROP
DROP TABLE IF EXISTS public.asyncmotor_rated;
DROP SEQUENCE IF EXISTS public.asyncmotor_rated_id_seq;

-- CREATE
CREATE SEQUENCE IF NOT EXISTS public.asyncmotor_rated_id_seq;

CREATE TABLE IF NOT EXISTS public.asyncmotor_rated
(
    id integer NOT NULL DEFAULT nextval('asyncmotor_rated_id_seq'::regclass),
    component_id INTEGER NOT NULL DEFAULT -1,

    voltage DOUBLE PRECISION NOT NULL DEFAULT 0.4, -- 额定电压 0.4~35
    power DOUBLE PRECISION NOT NULL DEFAULT 0.0, -- 额定功率 0.01~
    eff_100fl DOUBLE PRECISION NOT NULL DEFAULT 96.8, -- 额定效率 0~100(%)
    eff_75fl DOUBLE PRECISION NOT NULL DEFAULT 97.5, -- 额定效率 0~100(%)
    eff_50fl DOUBLE PRECISION NOT NULL DEFAULT 97.5, -- 额定效率 0~100(%)
    eff_0fl DOUBLE PRECISION NOT NULL DEFAULT 0, -- 额定效率 0~100(%)
    pf_100fl DOUBLE PRECISION NOT NULL DEFAULT 88, -- 额定功率因数 0~100(%)
    pf_75fl DOUBLE PRECISION NOT NULL DEFAULT 85, -- 额定功率因数 0~100(%)
    pf_50fl DOUBLE PRECISION NOT NULL DEFAULT 80, -- 额定功率因数 0~100(%)
    pf_0fl DOUBLE PRECISION NOT NULL DEFAULT 70, -- 额定功率因数 0~100(%)
    fla DOUBLE PRECISION NOT NULL DEFAULT 0.0, -- 满载电流 0.01~
    sf DOUBLE PRECISION NOT NULL DEFAULT 1, -- 电动机使用系数 0~10
    nla DOUBLE PRECISION NOT NULL DEFAULT 0.0, -- 空载电流 0~999
    rc DOUBLE PRECISION NOT NULL DEFAULT 0.0, -- 额定转子电流 0.01~
    ocv DOUBLE PRECISION NOT NULL DEFAULT 0.0, -- 额定开路电压 0.4~35
    sc_mpl DOUBLE PRECISION NOT NULL DEFAULT 6.5, -- 启动电流倍数 1~20
    sc DOUBLE PRECISION NOT NULL DEFAULT 0.01~65536, -- 启动电流值 1~20
    st_100un DOUBLE PRECISION NOT NULL DEFAULT 0.0, -- 起动时间 1~999
    st_80un DOUBLE PRECISION NOT NULL DEFAULT 0.0, -- 起动时间 1~999
    pf DOUBLE PRECISION NOT NULL DEFAULT 0.0, -- 1~100(%)
    xr DOUBLE PRECISION NOT NULL DEFAULT 0.0, -- 0~100
    pole_num SMALLINT NOT NULL DEFAULT 4, -- 极数 1~200
    sync_speed INTEGER NOT NULL DEFAULT 1500, -- 同步转速 30~3000
    rated_speed INTEGER NOT NULL DEFAULT 1498, -- 额定转速 0~3000
    rated_slip DOUBLE PRECISION NOT NULL DEFAULT 98.5, -- 额定转差率 0~100(%)
    rated_torque DOUBLE PRECISION NOT NULL DEFAULT 0.0, -- 额定转矩 0.01~
    max_torque_pct DOUBLE PRECISION NOT NULL DEFAULT 200, -- 最大转矩百分比(相对额定转矩) 100~500(%)
    stall_torque_pct DOUBLE PRECISION NOT NULL DEFAULT 60, -- 堵转转矩百分比(相对额定转矩) 1~100(%)

    op integer NOT NULL DEFAULT '-1'::integer,
    ts timestamp with time zone NOT NULL DEFAULT CURRENT_TIMESTAMP,

    CONSTRAINT asyncmotor_rated_id_PrimaryKey PRIMARY KEY (id),
    CONSTRAINT asyncmotor_rated_ForeignKey_component_id FOREIGN KEY (component_id)
        REFERENCES public.component (id) MATCH SIMPLE
        ON UPDATE NO ACTION
        ON DELETE NO ACTION
)

TABLESPACE pg_default;

ALTER TABLE IF EXISTS public.asyncmotor_rated
    OWNER to postgres;

COMMENT ON TABLE public.asyncmotor_rated
    IS '存储异步电动机的额定参数';