insert into
    public."component" (
        tag,
        grid,
        zone,
        station,
        page_id,
        type,
        name,
        context,
        op,
        ts
    )
values
    (
        'Demo1',
        1,
        1,
        1,
        1,
        3,
        'demo1',
        '{"left":"1.2","right":"13.5","buttom":"0.2","top":"5.4"}',
        1,
        '2021-01-01 00:00:00'
    );

insert into
    public."bus_stability" (
        component_id,
        resistance,
        anchor_v,
        uv_alarm,
        ov_alarm,
        anchor_i,
        ui_alarm,
        oi_alarm,
        op,
        ts
    )
values
    (
        1,
        100,
        false,
        90,
        110,
        true,
        90,
        110,
        1,
        '2021-01-01 00:00:00'
    );

insert into
    public."component" (
        tag,
        grid,
        zone,
        station,
        page_id,
        type,
        name,
        context,
        op,
        ts
    )
values
    (
        'Demo2',
        1,
        1,
        1,
        1,
        3,
        'demo2',
        '{"left":"3.2","right":"3.5","buttom":"1.2","top":"7.4"}',
        1,
        '2021-01-01 00:00:00'
    );

insert into
    public."bus_stability" (
        component_id,
        resistance,
        anchor_v,
        uv_alarm,
        ov_alarm,
        anchor_i,
        ui_alarm,
        oi_alarm,
        op,
        ts
    )
values
    (
        2,
        100,
        false,
        90,
        110,
        true,
        90,
        110,
        1,
        '2021-01-01 00:00:00'
    );

insert into
    public."component" (
        tag,
        grid,
        zone,
        station,
        page_id,
        type,
        name,
        context,
        op,
        ts
    )
values
    (
        'Demo3',
        1,
        1,
        1,
        1,
        3,
        'demo3',
        '{"left":"1.2","right":"1.5","buttom":"4.2","top":"9.5"}',
        1,
        '2021-01-01 00:00:00'
    );

insert into
    public."bus_stability" (
        component_id,
        resistance,
        anchor_v,
        uv_alarm,
        ov_alarm,
        anchor_i,
        ui_alarm,
        oi_alarm,
        op,
        ts
    )
values
    (
        3,
        100,
        false,
        90,
        110,
        true,
        90,
        110,
        1,
        '2021-01-01 00:00:00'
    );