CREATE TABLE public."Demo" (
    id serial NOT NULL,
    global_uuid uuid NOT NULL,
    demo_number integer NOT NULL,
    demo_name character varying(20) default 'Demox' NOT NULL,
    voltage decimal(5, 2) NOT NULL,
    voltage_upper_limit decimal(5, 2) NOT NULL,
    voltage_lower_limit decimal(5, 2) NOT NULL,
    anchor_voltage boolean NOT NULL,
    current decimal(5, 2) NOT NULL,
    current_upper_limit decimal(5, 2) NOT NULL,
    current_lower_limit decimal(5, 2) NOT NULL,
    anchor_current boolean NOT NULL,
    resistance decimal(5, 2) NOT NULL,
    anchor_para_list text NULL
);

ALTER TABLE
    public."Demo"
ADD
    CONSTRAINT "Demo_pkey" PRIMARY KEY (global_uuid)